-- -------------------------------------------------------------
-- TablePlus 3.11.0(352)
--
-- https://tableplus.com/
--
-- Database: core.db
-- Generation Time: 2023-08-18 16:35:22.2040
-- -------------------------------------------------------------


DROP TABLE IF EXISTS "unit";
CREATE TABLE `unit` (`created` integer,`modified` integer,`id` text NOT NULL,`symbol` text,`unit_name` text,PRIMARY KEY (`id`));

INSERT INTO "unit" ("created", "modified", "id", "symbol", "unit_name") VALUES
('0', '0', '1050529135', 'h㎡', '公顷'),
('0', '0', '1067028776', 'day', '日'),
('0', '0', '1120305984', 'Lux', '照度'),
('0', '0', '1171392092', 'kW·h', '千瓦时'),
('0', '0', '1227251678', 'km/h', '千米每小时'),
('0', '0', '1237352920', 'MB', '兆字节'),
('0', '0', '1238408930', 'mm/hour', '降雨量'),
('0', '0', '1251210766', 'year', '年'),
('0', '0', '1260714642', 'cst', '厘斯'),
('0', '0', '1272565758', 'm/s', '米每秒'),
('0', '0', '1285504879', 'eV', '电子伏'),
('0', '0', '1287162010', 'μg/m³', '微克每立方米'),
('0', '0', '1307611620', 'm', '米'),
('0', '0', '1319961390', 'ppb', '微克每升'),
('0', '0', '134439448', 'ml/min', '滴速'),
('0', '0', '1387479228', 'mg/L', '毫克每升'),
('0', '0', '141205568', 'mV', '毫伏'),
('0', '0', '1435764379', 'KCL/h', '千卡每小时'),
('0', '0', '1508611453', '℉', '华氏度'),
('0', '0', '1661756366', 'uw/cm2', '微瓦每平方厘米'),
('0', '0', '1677031383', 'mg/kg', '毫克每千克'),
('0', '0', '1679257298', 'μF', '微法'),
('0', '0', '1683998972', 'kV', '千伏'),
('0', '0', '1714926017', 'aw', '饱和度'),
('0', '0', '1733101572', 'gear', '档'),
('0', '0', '1756968242', 'Nm3/h', '标准立方米每小时'),
('0', '0', '1784830245', 'cm³', '立方厘米'),
('0', '0', '1828218537', 'L', '升'),
('0', '0', '1869154096', 'L/s', '升每秒'),
('0', '0', '195332683', 'hPa', '百帕'),
('0', '0', '1988291048', 'Ω', '欧姆'),
('0', '0', '2011027793', '㎡', '平方米'),
('0', '0', '2042762171', 'μW', '微瓦'),
('0', '0', '2047337380', 'mPa', '毫帕'),
('0', '0', '2062037286', 'km', '千米'),
('0', '0', '2095500789', 'min', '分钟'),
('0', '0', '2141083904', 'ms', '毫秒'),
('0', '0', '2143472013', 'dS/m', '土壤EC值'),
('0', '0', '2147159174', '%RH', '相对湿度'),
('0', '0', '2183644179', 'mmHg', '血压'),
('0', '0', '2189718870', 'N', '牛'),
('0', '0', '222593263', 'ppt', '纳克每升'),
('0', '0', '2370070327', 'V', '伏特'),
('0', '0', '2378761198', 'KB', '千字节'),
('0', '0', '2408955285', 'K', '开尔文'),
('0', '0', '2409660279', 'rad', '弧度'),
('0', '0', '2448208422', 't', '吨'),
('0', '0', '2463502558', 'cP', '厘泊'),
('0', '0', '2478074432', 'kJ', '千焦'),
('0', '0', '2499648623', 'Wh', '瓦时'),
('0', '0', '2556697285', 'N/C', '牛顿每库仑'),
('0', '0', '2583833740', 'bit', '比特'),
('0', '0', '2599919762', 'pH', 'PH值'),
('0', '0', '2689073860', 'c㎡', '平方厘米'),
('0', '0', '2705262257', 'dB', '分贝'),
('0', '0', '2723823852', 'μg/L', '微克每升'),
('0', '0', '2734512982', 'm³/h', '立方米每小时'),
('0', '0', '28257656', '只', '只'),
('0', '0', '2873975842', 'nm', '纳米'),
('0', '0', '2886629856', 'μA', '微安'),
('0', '0', '2906315097', 'kVA', '千伏安'),
('0', '0', '2908271923', 'grav', '重力加速度'),
('0', '0', '2936832121', 'var', '乏'),
('0', '0', '3086572956', 'k㎡', '平方千米'),
('0', '0', '3162839703', 'g/m³', '克每立方米'),
('0', '0', '3204969447', '°C', '摄氏度'),
('0', '0', '322039693', 'kA', '千安'),
('0', '0', '3233363857', 'kvarh', '千乏时'),
('0', '0', '3341593720', 'm³/s', '立方米每秒'),
('0', '0', '3346885911', 'W', '瓦特'),
('0', '0', '3413923127', 'kVar', '千乏'),
('0', '0', '3459716093', 'g/mL', '克每毫升'),
('0', '0', '3494680817', 'V/m', '伏特每米'),
('0', '0', '3521657261', 'kW', '千瓦特'),
('0', '0', '3526333271', 'lm', '流明'),
('0', '0', '3536079172', 't/h', '吨每小时'),
('0', '0', '3553987486', 'GB', '吉字节'),
('0', '0', '3561194250', 'bar', '巴'),
('0', '0', '3629750633', 'mmol/L', '血糖'),
('0', '0', '3652169375', 'Hz', '赫兹'),
('0', '0', '365283601', 'turn/m', '转每分钟'),
('0', '0', '3703938640', 'A', '安培'),
('0', '0', '37132377', '', '无'),
('0', '0', '3731553406', 'mL', '毫升'),
('0', '0', '3760450650', 'mg', '毫克'),
('0', '0', '3787019170', 'cal', '卡路里'),
('0', '0', '3805681504', 'Mpa', '兆帕'),
('0', '0', '3806667110', 'kg/s', '公斤每秒'),
('0', '0', '3853768919', 'h', '小时'),
('0', '0', '3856243771', 'dm', '分米'),
('0', '0', '3884000677', 'week', '周'),
('0', '0', '3892504745', '°', '度'),
('0', '0', '3924872958', 'kcal', '千卡路里'),
('0', '0', '3940003094', 'mA', '毫安'),
('0', '0', '3977392320', 'F', '法拉'),
('0', '0', '397886103', 'ppm', '百万分率'),
('0', '0', '397910032', '″', '秒'),
('0', '0', '3988157679', 'Pa', '帕斯卡'),
('0', '0', '3990541668', 'km³', '立方千米'),
('0', '0', '4014143885', 'cm', '厘米'),
('0', '0', '4016744681', 'm㎡', '平方毫米'),
('0', '0', '4075453843', '%', '百分比'),
('0', '0', '4077977269', 'B', '字节'),
('0', '0', '4105600633', 'J', '焦耳'),
('0', '0', '4113191213', 'W/㎡', '太阳总辐射'),
('0', '0', '4152695738', 'mm³', '立方毫米'),
('0', '0', '4194933555', 'mW', '毫瓦'),
('0', '0', '4208273555', 'pF', '皮法'),
('0', '0', '4217036485', 's', '秒'),
('0', '0', '4260048369', 'g/L', '克每升'),
('0', '0', '4274342792', 'nF', '纳法'),
('0', '0', '4277998481', 'pixel', '像素'),
('0', '0', '431158833', 'kn', '节'),
('0', '0', '438347815', 'mm/s', '毫米每秒'),
('0', '0', '464628588', 'month', '月'),
('0', '0', '581708831', 'kg/m³', '千克每立方米'),
('0', '0', '595486107', 'g', '克'),
('0', '0', '599137820', 'kg', '千克'),
('0', '0', '642495303', 'count', '次'),
('0', '0', '674931946', 'r/min', '转每分钟'),
('0', '0', '696054434', 'pcs', '个'),
('0', '0', '775746730', '′', '分'),
('0', '0', '776042458', 'kPa', '千帕'),
('0', '0', '782893373', 'uS/cm', '微西每厘米'),
('0', '0', '871685355', 'stepCount', '步'),
('0', '0', '896425856', 'μg/(d㎡·d)', '微克每平方分米每天'),
('0', '0', '919248385', 'μm', '微米'),
('0', '0', '92495678', 'NTU', '浊度'),
('0', '0', '946558460', 'mg/m³', '毫克每立方米'),
('0', '0', '947850259', 'm³', '立方米'),
('0', '0', '991213995', 'mm', '毫米');
